
-- ----------------------------
-- 项目结论表
-- ----------------------------
drop table if exists `smart_assess`.`sys_conclusion`;
CREATE TABLE `smart_assess`.`sys_conclusion`  (
`id` bigint NOT NULL AUTO_INCREMENT,
`conclusion` varchar(500) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL COMMENT '评价结论',
`is_revise_manual` tinyint(1) NOT NULL DEFAULT 1 COMMENT '是否有评价报告修改说明(0否 1是)',
`project_id` bigint NOT NULL COMMENT '项目id',
`version` int NULL DEFAULT 0 COMMENT '乐观锁',
`del_flag` tinyint NULL DEFAULT 0 COMMENT '删除标志(0正常，1删除，默认0)',
`create_by` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL COMMENT '创建人',
`create_time` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP,
`update_by` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL COMMENT '更新人',
`update_time` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP,
`remark` varchar(50) NULL COMMENT '备注',
PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci COMMENT = '项目结论表' ROW_FORMAT = DYNAMIC;