
-- ----------------------------
-- 审核表
-- ----------------------------
CREATE TABLE `smart_assess`.`ass_audit`  (
`id` bigint NOT NULL AUTO_INCREMENT,
`audit_date` datetime NOT NULL COMMENT '审核日期',
`affirm_date` datetime NOT NULL COMMENT '内部审核确定日期',
`project_id` bigint NOT NULL COMMENT '项目id',
`audit_type` tinyint(2) NOT NULL COMMENT '审核类型(1内部审核2技术审核)',
`assessor_id` bigint NOT NULL COMMENT '审核人id',
`is_amend_finish` tinyint(1) NOT NULL DEFAULT 1 COMMENT '已按要求修改完成(0否 1是)',
`is_basis` tinyint(1) NOT NULL DEFAULT 1 COMMENT '评价依据是否充分、准确、有效(0否 1是)',
`is_conclusion` tinyint(1) NOT NULL DEFAULT 1 COMMENT '结论是否正确(0否 1是)',
`is_danger_overall` tinyint(1) NOT NULL DEFAULT 1 COMMENT '危险有害因素识别是否全面(0否 1是)',
`is_file` tinyint(1) NOT NULL DEFAULT 1 COMMENT '附件与附图是否有效及规范(0否 1是)',
`is_format` tinyint(1) NOT NULL DEFAULT 1 COMMENT '格式是否符合要求(0否 1是)',
`is_measure` tinyint(1) NOT NULL DEFAULT 1 COMMENT '对策措施与建议是否可行(0否 1是)',
`is_method_selection` tinyint(1) NOT NULL DEFAULT 1 COMMENT '评价方法选择是否适当(0否 1是)',
`is_report_audit` tinyint(1) NOT NULL DEFAULT 1 COMMENT '可报技术负责人审核(0否 1是)',
`is_scope` tinyint(1) NOT NULL DEFAULT 1 COMMENT '评价范围是否与合同一致(0否 1是)',
`is_text` tinyint(1) NOT NULL DEFAULT 1 COMMENT '文字、数据是否准确(0否 1是)',
`is_unit_division` tinyint(1) NOT NULL DEFAULT 1 COMMENT '评价单元划分是否合理(0否 1是)',
`is_basis_quote` tinyint(1) NOT NULL DEFAULT 1 COMMENT '报告中所列评价依据是否得到引用和验证(0否 1是)',
`is_conclusion_right` tinyint(1) NOT NULL DEFAULT 1 COMMENT '评价结论及格式是否正确(0否 1是)',
`is_danger_full` tinyint(1) NOT NULL DEFAULT 1 COMMENT '危险有害因素识别是否充分(0否 1是)',
`is_data` tinyint(1) NOT NULL DEFAULT 1 COMMENT '现场收集的有关资料是否齐全、有效(0否 1是)',
`is_omission` tinyint(1) NOT NULL DEFAULT 1 COMMENT '报告中是否有重大遗漏(0否 1是)',
`is_measure_equitable` tinyint(1) NOT NULL DEFAULT 1 COMMENT '对策措施及建议是否有针对性、合理性(0否 1是)',
`is_method_rational` tinyint(1) NOT NULL DEFAULT 1 COMMENT '评价方法选用是否合理(0否 1是)',
`suggestions` varchar(500) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL COMMENT '存在问题及建议(500字符)',
`del_flag` tinyint NULL DEFAULT 0 COMMENT '删除标志(0正常，1删除，默认0)',
`version` int NULL DEFAULT 0 COMMENT '乐观锁',
`create_by` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL COMMENT '创建人',
`create_time` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP,
`update_by` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL COMMENT '更新人',
`update_time` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP,
`remark` varchar(50) NULL COMMENT '备注',
PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci COMMENT = '审核表' ROW_FORMAT = DYNAMIC;