
-- ----------------------------
-- 签字确认表
-- ----------------------------
CREATE TABLE `smart_assess`.`ass_face_recognition`  (
`id` bigint NOT NULL AUTO_INCREMENT,
`person_id` bigint NOT NULL COMMENT '人员id',
`project_id` bigint NOT NULL COMMENT '项目id',
`sign_path` varchar(100) NULL COMMENT '签字图片路径',
`insurance_pic_id` bigint  DEFAULT NULL COMMENT '承诺书图片id',
`version` int NULL DEFAULT 0 COMMENT '乐观锁',
`del_flag` tinyint NULL DEFAULT 0 COMMENT '删除标志(0正常，1删除，默认0)',
`create_by` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL COMMENT '创建人',
`create_time` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP,
`update_by` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL COMMENT '更新人',
`update_time` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP,
`remark` varchar(50) NULL COMMENT '原因说明',
PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci COMMENT = '签字确认表' ROW_FORMAT = DYNAMIC;