--2023-11-10
ALTER TABLE `smartlabdb`.`sys_reagent`
MODIFY COLUMN `price` decimal(16, 4) NULL DEFAULT NULL COMMENT '含税售价' AFTER `reagent_unit`;

ALTER TABLE `smartlb`.`ope_apply`
MODIFY COLUMN `apply_price` decimal(16, 4) NULL DEFAULT NULL COMMENT '申购价格' AFTER `apply_goal`;